<HTML><HEAD>
<TITLE>ERROR: The requested URL could not be retrieved</TITLE>
</HEAD><BODY>
<H1>ERROR</H1>
<H2>The requested URL could not be retrieved</H2>
<HR>
<P>
An FTP authentication failure occurred
while trying to retrieve the URL:
<A HREF="ftp://ftp.math.utah.edu/pub/bibnet/tools/examples/texnames.sty">ftp://ftp.math.utah.edu/pub/bibnet/tools/examples/texnames.sty</A>
<P>
Squid sent the following FTP command:
<blockquote><strong><pre>PASS &lt;yourpassword&gt;</pre></strong></blockquote>
and then received this reply
<blockquote><strong><pre>Login incorrect.</pre></strong></blockquote>
<blockquote><strong><pre></pre></strong></blockquote>
<P>Your cache administrator is <A HREF="mailto:sysad@ee.iitb.ernet.in">sysad@ee.iitb.ernet.in</A>. 

<br clear="all">
<hr noshade size=1>
Generated Wed, 25 Sep 2002 03:02:27 GMT by bhairav.ee.iitb.ac.in (Squid/2.4.STABLE4)
</BODY></HTML>
